-- phpMyAdmin SQL Dump
-- version 5.1.1
-- https://www.phpmyadmin.net/
--
-- Host: 127.0.0.1:3306
-- Generation Time: Nov 09, 2022 at 07:37 AM
-- Server version: 10.5.13-MariaDB-cll-lve
-- PHP Version: 7.2.34

SET SQL_MODE = "NO_AUTO_VALUE_ON_ZERO";
START TRANSACTION;
SET time_zone = "+00:00";


/*!40101 SET @OLD_CHARACTER_SET_CLIENT=@@CHARACTER_SET_CLIENT */;
/*!40101 SET @OLD_CHARACTER_SET_RESULTS=@@CHARACTER_SET_RESULTS */;
/*!40101 SET @OLD_COLLATION_CONNECTION=@@COLLATION_CONNECTION */;
/*!40101 SET NAMES utf8mb4 */;

--
-- Database: `u488983909_neonflake`
--

-- --------------------------------------------------------

--
-- Table structure for table `espdata`
--

CREATE TABLE `espdata` (
  `S.No` int(10) NOT NULL,
  `Temperature` varchar(10) COLLATE utf8mb4_unicode_ci NOT NULL,
  `Luminosity` varchar(10) COLLATE utf8mb4_unicode_ci NOT NULL,
  `pH` varchar(10) COLLATE utf8mb4_unicode_ci NOT NULL,
  `Time` timestamp NOT NULL DEFAULT current_timestamp() ON UPDATE current_timestamp()
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_unicode_ci;

--
-- Indexes for dumped tables
--

--
-- Indexes for table `espdata`
--
ALTER TABLE `espdata`
  ADD PRIMARY KEY (`S.No`);

--
-- AUTO_INCREMENT for dumped tables
--

--
-- AUTO_INCREMENT for table `espdata`
--
ALTER TABLE `espdata`
  MODIFY `S.No` int(10) NOT NULL AUTO_INCREMENT;
COMMIT;

/*!40101 SET CHARACTER_SET_CLIENT=@OLD_CHARACTER_SET_CLIENT */;
/*!40101 SET CHARACTER_SET_RESULTS=@OLD_CHARACTER_SET_RESULTS */;
/*!40101 SET COLLATION_CONNECTION=@OLD_COLLATION_CONNECTION */;
